<br />
<b>Strict Standards</b>:  Non-static method BibtexComponent::generateBibtex() should not be called statically, assuming $this from incompatible context in <b>/web/www/webdev1/nobackup/database/apache/wei/fomcms/apps/cms/controllers/cms_controller.php</b> on line <b>625</b><br />
@ARTICLE{AndrejAtallahBaeckerCamierCopelandDobrevDudouitDuswaldKeithKimKolevLazarovMittalPaznerPetridesShiraiwaStowellTomov2024,
  author          = {Andrej, J. and Atallah, N. and B\"{a}cker, J. and Camier , J. and Copeland, D. and Dobrev, V. and Dudouit, Y. and Duswald, T. and Keith, B. and Kim, D. and Kolev, T. and Lazarov, B. and Mittal, K. and Pazner, W. and Petrides, S. and Shiraiwa, S. and Stowell, M. and Tomov, V.},
  title           = {High--performance finite elements with MFEM},
  journal         = {The International Journal of High Performance Computing Applications},
  year            = {2024},
  volume          = {38},
  number          = {5},
  pages           = {447-467},
  month           = sep,
  note            = {doi.org/10.1177/10943420241261981},
}

