<br />
<b>Strict Standards</b>:  Non-static method BibtexComponent::generateBibtex() should not be called statically, assuming $this from incompatible context in <b>/web/www/webdev1/nobackup/database/apache/wei/fomcms/apps/cms/controllers/cms_controller.php</b> on line <b>625</b><br />
@PHDTHESIS{BinSaghir2025,
  author          = {Bin Saghir, M.},
  title           = {A Unified Approach to Finite Element Simulation of Elastoviscoplastic Fluid Flows},
  school          = {TU Dortmund},
  year            = {2025},
}

