<br />
<b>Strict Standards</b>:  Non-static method BibtexComponent::generateBibtex() should not be called statically, assuming $this from incompatible context in <b>/web/www/webdev1/nobackup/database/apache/wei/fomcms/apps/cms/controllers/cms_controller.php</b> on line <b>625</b><br />
@ARTICLE{OlshanskiiBaeckerKuzmin2025b,
  author          = {Olshanskii, M. and B\"{a}cker, J. and Kuzmin, D.},
  title           = {Projected gradient stabilization of sharp and diffuse interface formulations in unfitted Nitsche finite element methods},
  journal         = {Experimental Mathematics},
  year            = {2025},
  volume          = {59},
  number          = {6},
  pages           = {2933-2955},
  month           = dec,
  note            = {https://doi.org/10.1051/m2an/2025079},
}

