<br />
<b>Strict Standards</b>:  Non-static method BibtexComponent::generateBibtex() should not be called statically, assuming $this from incompatible context in <b>/web/www/webdev1/nobackup/database/apache/wei/fomcms/apps/cms/controllers/cms_controller.php</b> on line <b>625</b><br />
@MISC{BaeckerKuzmin2024,
  author          = {B\"{a}cker, J. and Kuzmin, D.},
  title           = {An Unfitted Diffuse Interface Method for Elliptic Interface Problems},
  year            = {2024},
  month           = aug,
  note            = {Multimat 2024},
}

